diagram_definition(type = "IDEF3 Object Dictionary",
  category = "Process modelling types",
  hardy_version = 1.35,
  custom_menu_strings = [],
  show_toolbar = 1,
  show_palette = 1,
  show_layout_menu = 1,
  show_hyperlinks_menu = 1,
  show_help_menu = 1,
  show_edit_menu = 1,
  show_file_menu = 1).

node_definition(type = "Object",
  format_string = "%1",
  abbreviation_format_string = "%1",
  colour = "CYAN",
  text_size = 10,
  highlight_if_linked = 1,
  attributes = ["Id"],
  region1 = ["0", "%1", 3, 8, 75, 90, 90, "BLACK"],
  default_width = 60,
  default_height = 30,
  outline_width = 1,
  can_resize = 1,
  centre_text = 1,
  use_attachments = 0,
  outline_colour = "BLACK",
  outline_style = 100,
  library_name = "Standard",
  symbol_name = "Rectangle",
  shadow = 0,
  space_attachments = 1,
  display_on_palette = 1).

